/*
 Navicat Premium Dump SQL

 Source Server         : 国航
 Source Server Type    : MySQL
 Source Server Version : 80030 (8.0.30-commercial)
 Source Host           : 10.211.67.169:3306
 Source Schema         : UNIDIA

 Target Server Type    : MySQL
 Target Server Version : 80030 (8.0.30-commercial)
 File Encoding         : 65001

 Date: 18/06/2025 07:58:58
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for system_cache_algorithm
-- ----------------------------
DROP TABLE IF EXISTS `system_cache_algorithm`;
CREATE TABLE `system_cache_algorithm`  (
  `algorithm_code` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL,
  `service_code` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NOT NULL,
  `key_name` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NOT NULL,
  `last_value` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL,
  PRIMARY KEY (`algorithm_code`, `service_code`, `key_name`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb3 COLLATE = utf8mb3_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
