/*
 Navicat Premium Dump SQL

 Source Server         : 国航
 Source Server Type    : MySQL
 Source Server Version : 80030 (8.0.30-commercial)
 Source Host           : 10.211.67.169:3306
 Source Schema         : UNIDIA

 Target Server Type    : MySQL
 Target Server Version : 80030 (8.0.30-commercial)
 File Encoding         : 65001

 Date: 18/06/2025 07:58:39
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for container_info
-- ----------------------------
DROP TABLE IF EXISTS `container_info`;
CREATE TABLE `container_info`  (
  `container_code` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '容器编号',
  `work_dir` varchar(1024) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NOT NULL COMMENT '工作路径',
  `java_version` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '环境版本',
  `os_info` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '操作系统',
  `cpu_cores` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT 'CPU核心数',
  `free_memory` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '可用内存',
  `total_memory` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '总计内存',
  `run_state` int NULL DEFAULT NULL COMMENT '运行状态',
  `last_time` datetime NULL DEFAULT NULL COMMENT '最后运行时间',
  `is_enabled` int NULL DEFAULT NULL COMMENT '是否启用',
  `description` varchar(1024) CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci NULL DEFAULT NULL COMMENT '描述',
  PRIMARY KEY (`container_code`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb3 COLLATE = utf8mb3_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
